Oxford BSP Toolset [flags -O1 -fcombine-puts -fcontention-res...]

Oxford BSP Toolset [flags -O1 -fcombine-puts -fcontention-res...]288.404 seconds elapsed on a IBM SP2 Wed Jul 17 09:14:19 1996

SP2 with switching network

173 174 176 177 179 181 182 184 185 187 seconds 0 200 400 600 800 1000

1200

1400

1600

1800

Kbytes in

4

10

10

10

10

10

10

10

10

10 10

10

10 10 10 10

10

10 10

1010 10 10101010101010101010101010101010101010 10

10 10 10 10 10 10 10 10 10

10

10 10

1010 10 10101010101010101010101010101010101010 10

10 10 10 10 10

10

10

10

10

173 174 176 177 179 181 182 184 185 187 seconds 0 200 400 600 800 1000

1200

1400

1600

1800

Kbytes out

4

10

10

10

10

10

10

10

10

10 10

10

10 10 10 10

10

10 10

1010 10 10101010101010101010101010101010101010 10

10 10 10 10 10 10 10 10 10

10

10 10

1010 10 10101010101010101010101010101010101010 10

10 10 10 10 10

10

10

10

10 4 bsp_reduce 192

 5 bsp_reduce 197

 6 bsp_reduce 201

10 op_buff.f 522

Step Filename Line

Process 0

Process 1

Process 2

Process 3

Process 4

Process 5

Process 6

Process 7